-0.1

-0.08

-0.06

-0.04

-0.02

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 β

A_L(β, Q^2, x_p) D

Q^2 = 20 GeV^2, x_p = 0.001 Q^2 = 50 GeV^2, x_p = 0.001 Q^2 = 20 GeV^2, x_p = 0.003 Q^2 = 50 GeV^2, x_p = 0.003