0

0.01

0.02

0.03

0.04

0.05

0 10 20 30 40 50 60 70 80 90 p [GeV] dσ/dp [pb/GeV] dotted: including P wave contributions continuous, dashed, dash-dotted: P_-= -1, 0, +1 (P_+= 0)

a) E = -3 GeV

0

0.01

0.02

0.03

0.04

0.05

0 10 20 30 40 50 60 70 80 90 p [GeV] dσ/dp [pb/GeV] b) E = 0

0

0.02

0.04

0.06

0 10 20 30 40 50 60 70 80 90 p [GeV] dσ/dp [pb/GeV] c) E = 3 GeV