0

0.2

0.4

0.6

0.8

-1 0 1 2

-2 -1 0 1 2 0

0.2

0.4

0.6

0.8

κ

SM Double Higgs-strahlung: e^+ e^- → ZHH Ρs = 500 GeV/M_H = 110 GeV σ^{pol}(ZHH;κ) ΜfbΝ ZHH

SM