-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05

10 20 30 40 50 -3 -2.5 -2 -1.5 -1 -0.5 0

10 20 30 40 50

-0.225

-0.2

-0.175

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025

10 20 30

p_{T max}

A_p p_{T max} (min) scr p_{T min}

A_p p_{T min}(min) scr

-1.4

-1.2 -1 -0.8

-0.6

-0.4

-0.2 0

10 20