0 1 2

0 50 100 150 0 2.5 5 7.5 10

0 50 100 150

0 0.02

0.04

0.06

0 50 100 150

-0.4

-0.3

-0.2

-0.1 0

0 50 100 150

0 0.02

0.04

0.06

0 50 100 150

dσ/dΘ, GB-event, Θ dσ/dΘ, PGF-event, Θ

Δdσ/dΘ, GB-event, Θ Δdσ/dΘ, PGF-event, Θ

Δdσ/dσ, GB-event, Θ Δdσ/dσ, PGF-event, Θ

-0.1

-0.075

-0.05

-0.025 0

0 50 100 150