κ^2=0 κ^2=0.1

A_ν(x) B_ν(x)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

0.4 0.6 0.8 1

-1.2 -1 -0.8

-0.6

-0.4

-0.2 0

0.4 0.6 0.8 1