0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0 10 20 30 40 50 60 e^+e^-→ t + .. E_{tot} = 349 GeV

m_t = 174.5 GeV

175.5

α_s = 0.118 ± 0.003

p_t[GeV] dσ dp_t

[pb/GeV]