s_{min} [GeV^2] σ [pb] s_{min} [GeV^2] σ [pb] s_{min} [GeV^2] σ [pb] s_{min} [GeV^2] σ [pb]

10 < Q^2 < 100 GeV^2 a) 100 < Q^2 < 1000 GeV^2 b)

1000 < Q^2 < 10000 GeV^2 c) Q^2 > 10000 GeV^2 d)

10000

11000

12000

13000

14000

15000

16000

10^{-2} 10^{-1} 1 10

3600

3800

4000

4200

4400

4600

4800

10^{-2} 10^{-1} 1 10 10^2

190 195 200 205 210 215 220 225 230

10^{-2} 10^{-1} 1 10 10^2 10^3 1.5

1.6

1.7

1.8

1.9

2

2.1

10^{-2} 10^{-1} 1 10 10^2 10^3 10^4