3.5

3.55

3.6

3.65

3.7

6 8 10

R_{had}(s)

Ρs [GeV] (a) u, d, s, c (incl. Singlet-term)

2.1

2.15

2.2

2.25

2.3

6 8 10 α_s(M_Z) = 0.120 α_s(M_Z) = 0.125

α_s(M_Z) = 0.115

R_{had}(s)

Ρs [GeV] (b) u, d, s (incl. Singlet-term)