E [GeV] dN/dE

c) m = 180 GeV E = -2.9 GeV (1S peak) E = 0.0 GeV E = 2.0 GeV

t

W

W

0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

96 100 104 108 112 116 120 124