α_s(M_Z^2) = 0.115 α_s(M_Z^2) = 0.120 α_s(M_Z^2) = 0.125

R,(b) √s 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4

400 450 500 550 600 650 700