0 0.2 0.4 0.6 0.8 1

-6 -5 -4 -3 -2 -1 0 1 2 3 4

M_H = Ζ M_H = 100 GeV M_H = 60 GeV

σ [pb] (a)

0 0.025

0.05

0.075 0.1 0.125

0.15

0.175 0.2 0.225

0.25

-6 -5 -4 -3 -2 -1 0 1 2 3 4 E [GeV]

Φ_R

Φ_I

(b) m_t = 180 GeV α_s = 0.125