0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45

-10 -5 0 5 10 15 20 25 30 E [GeV]

M_H = Ζ M_H = 100 GeV V = 0

m_t = 180 GeV α_s = 0.125