E [GeV]

R m_t = 180 GeV Λ = Λ =

Λ =

500 MeV 200 MeV 100 MeV

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

355 356 357 358 359 360 361 362