10^{-1}

1

10

0.7 0.8 0.9 1 δ/π

1/Γ dΓ/d cos δ

H,A5 tt 5 (bl^+ν) (bl^-ν)

_ _ _

m_t = 150 GeV

scalar pseudoscalar m_{H,A} = 1 TeV

m_{H,A} = 400 GeV