\documentstyle[german,12pt]{article}
\pagestyle{empty}
\begin{document}
\input{abkzeta}
A 500 GeV \eplus\eminus linear collider (NLC) is an important tool for future
high energy physic.
At NLC the top quark will be discoverd in the predicted range of 130 \pm
30 GeV \cite{Schaile} or the minimal standard model will faile.
Different acceleration methods /cite{cern} and layouts \cite{amaldi}
for a future collider are considerd.

\end{document}

