\documentstyle[epsfig,12pt]{article}
\setlength{\textwidth}{14.5cm}
\setlength{\textheight}{15.cm}
\setlength{\headheight}{0.cm}
\setlength{\headsep}{1.0cm}
\setlength{\topmargin}{-2.8cm}
\setlength{\topskip}{0.1cm}
\setlength{\footheight}{0.5cm}
\renewcommand{\baselinestretch}{1.1}
\setlength{\footskip}{1.5cm}
\pagestyle{empty}
\begin{document}
\begin{figure}
\begin{center}
\mbox{\epsfig{file=bild10.eps,width=12cm}}
\end{center}
\end{figure}
\end{document}

