-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

250 350 450 550 650 750 δσ [fb]

√ s [GeV]

LO exact NLO z· NNLO-SV ρ^0 ρ^1 ρ^2