CLEO01

BELLE01

BaBar07 BELLE09

BaBar12 BaBar12

HFAG Average NNLO

NNLO: Misiak et al. 06 E_γ Γ 1.6 GeV

BR(B 5 X_sγ) (10^{-4})

2 2.5 3 3.5 4 4.5 5

0 2 4 6 8 10