a_{23} a_{13} a_{12}

m_{soft}[GeV]

A^ν_{if} /m_{soft}

5000

4000

3000

2000

1000 0

1

0.1

0.01

0.001

A^ν_{23}

A^ν_{13}

A^ν_{12}

m_{soft}[GeV]

A^ν_{if} [GeV]

5000

4000

3000

2000

1000 0

1200 1000 800 600 400 200 0