(a) λ_{hhh} ΜGeVΝ m_h^{mod+} scenario M_A = 300 GeV tgβ = 5 μ_R = ξ M_{SUSY}/2

1-loop

2-loop

ξ 0.2 0.3 0.5 1 2 3 5 150 152 154 156 158 160 162 164 166 168 170 172