250 500 750 1000 m_ϕ [GeV]

10^{−3}

10^{−2}

10^{−1}

10^0 p-value

1σ

2σ

3σ ϕ = H ϕ = A ϕ = H^±

(a)

A → HZ H → AZ

H → AA

250 500 750 1000 m_H [GeV]

200 400 600 800 1000 m_A [GeV]

(b)

A → H^±W^∓ H^± → AW^±

250 500 750 1000 m_H± [GeV]

200 400 600 800 1000 m_A [GeV]

(c)

H → H^±W^∓ H^± → HW^±

H → H^+H^−

250 500 750 1000 m_H± [GeV]

200 400 600 800 1000 m_H [GeV]

(d)