τ 0 0.1 0.2 0.3 0.4 0.5

〉)π(0,_τ Re P 〈

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 c large-N (mean field approx.) c finite-N (exact) c finite-N

c c c c c c

3 π = _{in}θ