GeV)

/Λ(_{10} log 4 6 8 10 12 14 16 18

[GeV] HM

100

150

200

250

300

LEP exclusion at >95% CL

Tevatron exclusion at >95% CL

Perturbativity bound Stability bound Finite-T metastability bound Zero-T metastability bound

error bands, w/o theoretical errors σ Shown are 1 π = 2 λ π = λ