δ^{ZZ}_{EW} δ^{W−Z}_{EW} δ^{W+Z}_{EW} δ^{WW}_{EW}

M^{cut}_{V V} (GeV) δ(%)

2000

1800

1600

1400

1200

1000 800 600 400 200

5 0 −5 −10 −15 −20 −25 −30 −35 −40 LO(ZZ)

LO(W^−Z)

LO(W^+Z)

LO(WW) pp → V_1V_2(+γ) + X at √ s = 14 TeV

M^{cut}_{V V} (GeV) σ(fb)

2000

1800

1600

1400

1200

1000 800 600 400 200

100000

10000

1000 100 10 1 0.1