Μ_S�M_h�2 Μ_H�M_t

EFT: t�t� m_h^{max}� s �8TeV

Σ_t^{SQCD}�pb�, NNLO

6.82 8.48 10.4 12.3 13.9 15.3 16.2 16.9 17.4 17.8 18.1

5.27 7.01 9.23 11.6 13.6 15.1 16.1 16.8 17.3 17.6 17.8

4.17 5.92 8.37 11.1 13.5 15.1 16.2 16.8 17.2 17.5 17.7

3.37 5.06 7.69 10.9 13.5 15.3 16.3 16.9 17.2 17.5 17.6

2.77 4.35 7.10 10.7 13.7 15.4 16.4 16.9 17.3 17.5 17.6

2.31 3.77 6.57 10.5 13.8 15.6 16.5 17.0 17.3 17.5 17.6

1.95 3.29 6.10 10.4 14.0 15.8 16.7 17.1 17.3 17.5 17.6

1.66 2.88 5.66 10.3 14.2 16.0 16.7 17.1 17.3 17.5 17.5

1.43 2.54 5.25 10.3 14.3 16.1 16.8 17.2 17.4 17.5 17.5

1.24 2.24 4.87 10.2 14.5 16.2 16.9 17.2 17.4 17.5 17.5

1.08 1.99 4.52 10.1 14.6 16.3 17.0 17.3 17.4 17.5 17.5

0.955 1.78 4.19 10.0 14.8 16.4 17.0 17.3 17.4 17.5 17.5

0.847 1.59 3.88 9.94 14.9 16.5 17.1 17.3 17.4 17.5 17.5

0.756 1.43 3.59 9.84 15.0 16.6 17.1 17.3 17.4 17.5 17.5

0.678 1.28 3.31 9.73 15.1 16.7 17.1 17.3 17.4 17.5 17.5

0.611 1.16 3.06 9.61 15.2 16.7 17.2 17.4 17.4 17.5 17.5

0.553 1.05 2.83 9.48 15.3 16.8 17.2 17.4 17.5 17.5 17.5

16. 14. 12. 10. 8.

6.

4.

2.

100 120 140 160 180 200

5

10

15

20

M_A�GeV� tanΒ