Μ_S�M_h�2 Μ_H�M_t m_h^{max}� s �8TeV

K^{SQCD}, NNLOno EW

2.7 2.5 2.3 2.2 2.1 2.1 2.0 2.0 2.0 2.0 2.0

2.8 2.6 2.4 2.2 2.1 2.1 2.0 2.0 2.0 2.0 2.0

2.8 2.8 2.5 2.3 2.1 2.1 2.0 2.0 2.0 2.0 2.0

2.7 2.9 2.6 2.3 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.5 2.9 2.7 2.4 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.4 2.8 2.9 2.4 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.3 2.7 2.9 2.5 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.3 2.6 3.0 2.5 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.2 2.5 3.0 2.6 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.2 2.4 3.0 2.7 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.2 2.4 2.9 2.7 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.3 2.8 2.8 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.3 2.8 2.8 2.2 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.3 2.7 2.9 2.3 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.2 2.6 2.9 2.3 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.2 2.6 3.0 2.3 2.1 2.1 2.0 2.0 2.0 2.0

2.1 2.2 2.5 3.0 2.3 2.1 2.0 2.0 2.0 2.0 2.0

2. 2.2 2.8

2.20

100 120 140 160 180 200

5

10

15

20

M_A�GeV� tanΒ