[GeV] g~m 200 300 400 500 600 700 800

A [%]

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 - SQCD u u - SQCD d d - SEW u u

> 300 GeV q~m > 100 GeV t~m > 0 GeV 0 χ∼m