-0.03

-0.05

-0.1 -0.25 -0.5 -1 -1.5

2 1 [GeV] t~ - m t~m 0 100 200 300 400 500 600 700 800 900 1000

[GeV] min m

0 100 200 300 400 500 600 700 800 900 1000 [%] min (a) A