M [GeV]

0 100 200 300 400 500 600 700 800 900 1000

[%] (k) u,ijA

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 u,ij (1) A u,ij (2) A u,ij (3) A

a) SQCD loop functions