[GeV] k 0χ∼m 0 100 200 300 400 500 600 700 800 900 1000

[%] a u,ijk A

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

+ - + + - + + + - + + - - + - +

= 100 GeV g~ = m jt~ = m iu~m

SEW loop functions