| min yΔ|

0 0.5 1 1.5 2 2.5

[%] (k) u,ijA

0

0.5

1

1.5

2

2.5 u,ij (1) A u,ij (2) A u,ij (3) A

= 100 GeV g~ = m jt~ = m iu~m

b) SQCD loop functions