Δ_{NLO}: 1 − δ_{full}/δ_{appr.}

p^{cut}_T (GeV)

Δ_{NLO}(%)

2000

1800

1600

1400

1200

1000 800 600 400 200

20 15 10 5 0 Δ_{LO}: 1 - full/appr.

p^{cut}_T (GeV)

Δ_{LO}(%)

2000

1800

1600

1400

1200

1000 800 600 400 200

0 −2 −4 −6 −8 −10

NLO appr.

NLO full

Relative EW corrections δ(%)

0 −10 −20 −30 −40 −50 −60 −70

NLO full

LO appr.

LO full

pp → W^−W^+(γ) + X √ s = 14 TeV σ_{tot} (pb)

10 1 0.1 0.01 0.001 0.0001 10^{−5} 10^{−6} 10^{−7}