\begin{tabular}{c||c|c|c|c|c|c}
benchmark&$m_{\tilde{c}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{c}_{2}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{b}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{b}_{2}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{t}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{t}_{2}}\,\left[\mbox{GeV}\right]$
\\
point&&&&&&
\\\hline\hline
(a)&$562.26$&$545.89$&$516.91$&$546.24$&$399.73$&$586.53$
\\\hline
(b)&$457.94$&$445.62$&$421.76$&$448.10$&$319.81$&$499.59$
\\\hline
(c)&$351.37$&$343.26$&$325.09$&$348.45$&$242.07$&$413.19$
\\\hline
(d)&$664.59$&$644.23$&$610.48$&$642.77$&$479.61$&$673.26$
\\\hline
(e)&$765.52$&$741.20$&$702.91$&$738.14$&$559.00$&$759.85$
\\\hline
(f)&$865.36$&$837.09$&$794.42$&$832.56$&$637.74$&$846.32$
\\\hline
(g)&$964.15$&$931.94$&$885.04$&$926.03$&$715.69$&$932.52$
\\\hline
(h)&$1062.35$&$1026.20$&$975.15$&$1018.98$&$793.11$&$1018.75$
\\\hline
(i)&$873.27$&$845.41$&$777.67$&$826.04$&$661.71$&$839.81$
\\\hline
(j)&$1554.76$&$1552.07$&$1298.73$&$1539.74$&$970.87$&$1307.45$
\\\hline
(k)&$1298.41$&$1299.46$&$1073.69$&$1289.26$&$789.69$&$1083.38$
\\\hline
(l)&$1052.65$&$1056.68$&$860.37$&$1048.57$&$622.94$&$870.89$
\\\hline
(m)&$1815.83$&$1809.03$&$1528.82$&$1794.54$&$1157.84$&$1536.48$
\\\hline
(n)&$2079.20$&$2068.06$&$1761.18$&$2051.40$&$1347.10$&$1767.83$
\\\hline
(o)&$855.07$&$826.36$&$792.13$&$822.99$&$649.29$&$842.40$
\\\hline
(p)&$760.88$&$744.40$&$617.79$&$685.28$&$546.52$&$696.19$
\\\hline
(q)&$673.86$&$653.45$&$561.85$&$650.48$&$248.72$&$649.57$
\end{tabular}