\begin{tabular}{c||c|c|c|c|c|c}
benchmark&$m_{\tilde{d}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{d}_{2}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{u}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{u}_{2}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{s}_{1}}\,\left[\mbox{GeV}\right]$&$m_{\tilde{s}_{2}}\,\left[\mbox{GeV}\right]$
\\
point&&&&&&
\\\hline\hline
(a)&$567.77$&$545.62$&$562.26$&$545.89$&$567.77$&$545.62$
\\\hline
(b)&$464.72$&$446.20$&$457.94$&$445.62$&$464.72$&$446.20$
\\\hline
(c)&$360.24$&$344.94$&$351.37$&$343.26$&$360.24$&$344.94$
\\\hline
(d)&$669.23$&$643.23$&$664.59$&$644.23$&$669.23$&$643.23$
\\\hline
(e)&$769.54$&$739.52$&$765.52$&$741.20$&$769.54$&$739.52$
\\\hline
(f)&$868.90$&$834.78$&$865.36$&$837.09$&$868.90$&$834.78$
\\\hline
(g)&$967.33$&$929.03$&$964.15$&$931.94$&$967.33$&$929.03$
\\\hline
(h)&$1065.22$&$1022.71$&$1062.35$&$1026.20$&$1065.23$&$1022.71$
\\\hline
(i)&$876.84$&$843.16$&$873.27$&$845.41$&$876.84$&$843.16$
\\\hline
(j)&$1556.70$&$1552.46$&$1554.76$&$1552.07$&$1556.70$&$1552.46$
\\\hline
(k)&$1300.76$&$1300.38$&$1298.41$&$1299.46$&$1300.76$&$1300.38$
\\\hline
(l)&$1055.59$&$1058.08$&$1052.65$&$1056.68$&$1055.59$&$1058.08$
\\\hline
(m)&$1817.49$&$1808.85$&$1815.83$&$1809.03$&$1817.49$&$1808.85$
\\\hline
(n)&$2080.64$&$2067.30$&$2079.20$&$2068.06$&$2080.64$&$2067.30$
\\\hline
(o)&$858.66$&$824.01$&$855.07$&$826.36$&$858.66$&$824.01$
\\\hline
(p)&$764.91$&$743.68$&$760.88$&$744.40$&$764.91$&$743.68$
\\\hline
(q)&$678.15$&$652.40$&$673.86$&$653.45$&$678.15$&$652.40$
\end{tabular}