| (meas. not in the fit) Kε| 0.0010 0.0012 0.0014 0.0016 0.0018 0.0020 0.0022 0.0024 0.0026 0.0028 0.0030

1 - CL

0.0

0.2

0.4

0.6

0.8

1.0

FPCP 10

CKM_{f i t t e r}

c,tm,

cc,ct,tt

η, _εκ, _KB|, _{cb} on |V

Gaussian uncer. Rfit uncer. meas.