0.0 0.1 0.2 0.3 0.4 0.5

0.0000

0.0005

0.0010

0.0015

0.0020

0.0025

0.0030

Δ_{31}^{d LR}

Δ_{13}^{d LR}

Constraintson Δ_{13}^{d LR}Δ_{31}^{d LR} fromm_d