Energy, MeV

400 600 800 1000 1200

2 |_π|F

-1 10

1

10

770 780 790 800 810 25

30

35

40

45

50

CMD-2, 1995 data (published) CMD-2, 1996 data CMD-2, 1997 data CMD-2, 1998 data