[ GeV ] -eE 1 2 3 4 5

[ nb / 0.05 GeV ] dE σd

-110

1

10

210 BHWIDE

[ GeV ] -eE 1 2 3 4 5

[ nb / 0.05 GeV ] dE σd

-110

1

10

210 Babayaga@NLO

[ GeV ] -eE 1 2 3 4 5

[ nb / 0.05 GeV ] dE σd

-110

1

10

210 Babayaga.3.5

[ GeV ] -eE 1 2 3 4 5

difference in percent / 0.05 GeV

-80 -70 -60 -50 -40 -30 -20 -10 0 relative difference

0.03 ± 0.09

BHWIDE

BHWIDE - Babayaga@NLO

BHWIDE

BHWIDE - Babayaga.3.5

[ GeV ] -eE 4.9 5 5.1 5.2 5.3

difference in percent / 0.05 GeV

0

0.5

1

1.5

2 zoom in