10^{-1}

1

10

10^2

10^3

10^4

0.8 1 1.2 1.4 1.6

b)

Ρs, GeV/c^2

N_{EVENTS}/(11.5 MeV/c^2)

Signal K_SK_Lπ K_Sππ^0 K_SK 3π non-ττ