1

10

10^2

10^3

10^4

10^5

0.5 1 1.5 2 2.5 3 3.5 4

(M_π^Α_π^0)^2 (GeV/c^2)^2

Number of entries /0.05(GeV/c^2)^2

DATA MC(signal) τ^- 5 h^-(nπ^0)ν_τ τ^- 5 K^-π^0ν_τ τ^- 5 ω^0π^-ν_τ ( ω^0 5 π^0γ ) continuum B.G.