)^2

Mass (GeV/c

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

2 Events/0.04 GeV/c

0 500 1000

1500

2000

2500

3000

3500

4000

4500

5000 Data Signal MC Tau MC qqbar

BABAR

2

0