Data 2002 Monte Carlo

M^2 _{ππ} ΜGeV^2Ν

F.-B. asymmetry

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1