30 30

30 30

100

100 100

100 250 250

250 250

500 500

500 500

750

750 750

750

1000

1000 1000

1000

� 1.0 � 0.5 0.0 0.5 1.0

� 1.0

� 0.5

0.0

0.5

1.0

DeltaRR

DeltaLL