NLO_{real}/LO

NLO_{virt}/LO

(b) W^+

p_T [GeV]

2000

1800

1600

1400

1200

1000 800 600 400 200

0.00

-0.10

-0.20

-0.30

-0.40

−NLO_{real}

−NLO_{virt}

(a) W^+ dσ dp_T

[ pb/GeV ]

10^0 10^{−1} 10^{−2} 10^{−3} 10^{−4} 10^{−5} 10^{−6} 10^{−7} 10^{−8}