llϕΔ 0 0.5 1 1.5 2 2.5 3 0

5

10

15

20

25

Hphil_0 Nent = 17981 Mean = 1.173 RMS = 0.8692

SM Higgs

Spin 1, CP even

Spin 1, CP odd of the leptons ϕΔ Distribution of