ADONE(73)

DM1(79)

DM2(83)

DM2(90)

FENICE(93)

FENICE(94)

FENICE(98)

B : θ = 19π/64

A : θ = π/4

B

A e^+e^− → pp̄

s (GeV^2) σ (nb)

8 7 6 5 4 3

1.8 1.6 1.4 1.2 1 0.8 0.6 0.4 0.2 0