b) 50^∘ < θ_π± < 130^∘

√ s = 10.52 GeV

Q^2 (GeV^2)

(^{dσ}_{dQ2} )_{pair}/(^{dσ}_{dQ2} )_{ph}

1.2 1 0.8 0.6 0.4 0.2

0.0075

0.007

0.0065

0.006

0.0055

0.005

0.0045