a) √ s = 10.52 GeV no cuts

Q^2 (GeV^2)

(^{dσ}_{dQ2} )_{pair}/(^{dσ}_{dQ2} )_{ph}

1.2 1 0.8 0.6 0.4 0.2 0

0.0092

0.009

0.0088

0.0086

0.0084

0.0082

0.008

0.0078