a) √ s = 1.02 GeV no cuts

Q^2 (GeV^2)

(^{dσ}_{dQ2} )_{pair}/(^{dσ}_{dQ2} )_{ph}

1.2 1 0.8 0.6 0.4 0.2

0.005

0.0045

0.004

0.0035

0.003

0.0025

0.002